\documentclass{article}

\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsthm}
\usepackage{amsfonts}
\usepackage{graphicx}


\begin{document}

The graph of the tilted ellipse
$x^2-xy+y^2=3$ is shown below.  What are the dimensions and the
location of the box containing the ellipse?

\medskip

\noindent {\bf Note: } The sides of the box are vertical and horizontal
and also are tangent to the ellipse.

\includegraphics[]{w3K.png}
\end{document}