\input epsf
\nopagenumbers
\magnification=\magstep1

\noindent {\bf Problem statement} Sketch the cardioid
$r=1-\sin\theta$. What percent of its enclosed area is above the
$x$-axis? What percent of its enclosed area is inside a circle of
radius 1 centered at the origin?

\vfil\eject\end

