\input epsf
\nopagenumbers
\magnification=\magstep1


\rightline{\epsfxsize=2.4in\epsfbox{w4W.eps}}

\vskip -2.12in
\vtop{\hsize=2.9in
\noindent {\bf Problem statement} Suppose that the picture to the right
is the graph of a polynomial. What is the lowest degree that this
polynomial could have? Explain your assertion carefully.
}

\vfil\eject\end

